===
BOF
===

This Table below should be extended/ or deleted as a whole...:
more parameters and range
of parameters...

Table number One-and-one-half:
Top description (x-axis)
a 1) normal hearing
b 2) hearing impaired
c 3) electrical - no jitter
d 4) artificial jitter
e 5) (sub)optimal jitter

Side description (y-axis)
1) 40 - 160 Hz
2) 160 - 640 Hz
3) 640 - 2,560 Hz
4) 2,560 - 10,240 Hz

===





===
EOF
===
